<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">


\begin{longtable}{|p{0.2\textwidth}|p{0.3\textwidth}|p{0.4\textwidth}|}
\hline
\textbf{Function} &amp; \textbf{Function Description} &amp; \textbf{Notes} \\
\hline
\endhead % Header to repeat on each page

\hline
\multicolumn{3}{|r|} {\textit{Continued on next page...}} \\
\hline
\endfoot % Footer to repeat on each page

\hline
\multicolumn{3}{|l|}{\textit{End of Table}} \\
\hline
\endlastfoot % Footer on the last page

1.1 Pre assemble parts &amp; Gather and assemble the necessary components before installation. &amp; Preparation phase for hardware setup. \\
\hline
1.2.1 Mount the assembly &amp; Physically attach the assembled parts to the designated location. &amp; Secure installation of the base station hardware. \\
\hline
1.2.2 Inspect Mounting Equipment &amp; Verify the integrity and stability of the mounting equipment. &amp; Ensure safe and reliable installation. \\
\hline
1.3.1 Install Base Image &amp; Deploy the initial operating system and software configuration. &amp; Initial software setup for the base station. \\
\hline
1.3.2 Config new image &amp; Customize the installed base image with specific network settings and software. &amp; Configure to a custom environment. \\
\hline
1.3.3 Add Update Over Air &amp; Implement a system for remotely updating the base station's software. &amp; Enable remote software updates and maintenance. \\
\hline
1.4 Add Enclosure &amp; Perform Ventilation. Ensure proper airflow to prevent overheating. &amp; Maintain optimal operating temperature. \\
\hline
1.5 Power Assembly &amp; Provide power-source for Edge computers and peripheral &amp; Power Edge Device. \\
\hline
1.6 Power Remote Value &amp; Provide batter power for remote valve &amp; Ensure remote devices can receive turn on/off signal. \\
\hline
2.1.1 Measure Wind-speed &amp; Collect data on wind speed using sensors. &amp; Gather environmental data. \\
\hline
2.1.2 Measure Soil Moisture &amp; Collect data on soil moisture using sensors. &amp; Gather environmental data. \\
\hline
2.1.3 Measure Humidity &amp; Collect data on ambient humidity using sensors. &amp; Gather environmental data. \\
\hline
2.1.4 Measure Wind Direction &amp; Collect data on wind direction using sensors. &amp; Gather environmental data. \\
\hline
2.1.5 Measure Temperature &amp; Collect data on ambient temperature using sensors. &amp; Gather environmental data. \\
\hline
2.1.6 Measure Rainfall &amp; Collect data on rainfall using sensors. &amp; Gather environmental data. \\
\hline
2.1.7 Measure UV &amp; Collect data on ultraviolet radiation using sensors. &amp; Gather environmental data. \\
\hline
2.2.1 Extract &amp; Retrieve data from various sources. &amp; Data processing stage. \\
\hline
2.2.2 Transform &amp; Convert data into a usable format. &amp; Data processing stage. \\
\hline
2.2.3 Load &amp; Store processed data in a database or file. &amp; Data processing stage. \\
\hline
3.1.1 Preview Environment Info &amp; Display sensor data and environmental conditions. &amp; User interface for monitoring. \\
\hline
3.1.2 Preview Maintenance Info &amp; Display maintenance logs and system health. &amp; User interface for monitoring. \\
\hline
3.2.2 Give system access &amp; Grant permissions to users to access the system. &amp; Security and access control. \\
\hline
3.2.1 Create ad-hoc network &amp; Set up a temporary network for local communication. &amp; Network setup for local operations. \\
\hline
3.3.1 Built in-house service for Tracking &amp; Develop a custom tracking system. &amp; System management and monitoring. \\
\hline
3.3.2 Track Network Usuage &amp; Monitor data transmission and bandwidth. &amp; Network management. \\
\hline
3.3.3 Track Monthly Expense &amp; Monitor operational costs. &amp; Financial management. \\
\hline
3.3.4 Check Part Availability &amp; Verify the stock of replacement parts. &amp; Inventory management. \\
\hline
3.3.5 Track Warranty Duration &amp; Monitor warranty periods for equipment. &amp; Maintenance and support. \\
\hline
4.1.1 Check Moisture Level &amp; Monitor soil moisture to determine irrigation needs. &amp; Automation and control. \\
\hline
4.1.2 Predict Water Reservoir &amp; Estimate water availability based on collected data. &amp; Automation and control. \\
\hline
4.2.1 Connect Wireless Network &amp; Establish a wireless connection for remote control. &amp; Network setup for remote operations. \\
\hline
4.2.2 Send Turn On Signal &amp; Transmit a signal to activate the irrigation system. &amp; Automation and control. \\
\hline
5.1 Detect System Failure &amp; Identify malfunctions or errors in the system. &amp; Error handling and maintenance. \\
\hline
5.2.1 Generate User Input &amp; Allow users to input commands or data. &amp; User interface for control. \\
\hline
5.3.1 Collect Parts Handbook &amp; Gather documentation for system components. &amp; Maintenance and support. \\
\hline
5.3.2 Classification Inspection Type &amp; Categorize different types of inspections. &amp; Maintenance and support. \\
\hline
5.3.3 Classification Maintainance Type &amp; Categorize different types of maintenance. &amp; Maintenance and support. \\
\hline
5.3.4 Record Condition of System &amp; Document the operational status of the system. &amp; Maintenance and support. \\
\hline
\label{table:function-description}
\end{longtable}
</pre></body></html>