\section{System Design and Feasibility Analysis}
\subsection{Stakeholder Need Analysis}
    \begin{table}[h]
    \centering
    \begin{tabular}{|p{5cm}|p{10cm}|}
         \hline
         \textbf{Title} &  \textbf{Description} \\
         \hline
         Desired UV Level & The system should be able to withstand exposure to sunlight. \\
         Heating and Cooling & The system should be able to endure high temperatures. \\
         Number of Peripherals (Peripheral Types) & I prefer not to use any additional peripherals or devices to connect to the system. \\
         Number of People Required & I want to install and maintain the system by myself. \\
         Number of Tools Required (Tools Supported) & I want to install it with basic tools, such as a power drill and Phillips screws. \\
         Maximum Wind Speed Supported & The system should be stable and not be knocked over by the wind. \\
         Auto-Restart Mechanism (Emergency or Fail-Safe Mode) & The system should be able to reboot automatically in case of a malfunction. \\
         Number of Vendors (Parts Availability) & If a part fails, I want to be able to replace it with something readily available on the market. \\
         Number of Sensors Offered (Sensor Types) & The system should measure wind, sunlight, rain, and soil moisture levels in the field. \\
         Budget & I have a budget of \$1000 for this project. \\ 
         & I do not want to pay any monthly subscription fees for using or operating the system. This should be a one-time investment. \\
         Parts Recycling & I want to reuse some of the parts I already have on the farm, such as solar equipment or electrical wiring. \\
         \hline
    \end{tabular}
    \caption{Stakeholder Needs Capture}
    \label{tab:my_label}
\end{table}
\newpage
