<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\section{System Design and Feasibility Analysis}
\subsection{Stakeholder Need Analysis}
    \begin{table}[h]
    \centering
    \begin{tabular}{|p{5cm}|p{10cm}|}
         \hline
         \textbf{Title} &amp;  \textbf{Description} \\
         \hline
         Desired UV Level &amp; The system should be able to withstand exposure to sunlight. \\
         Heating and Cooling &amp; The system should be able to endure high temperatures. \\
         Number of Peripherals (Peripheral Types) &amp; I prefer not to use any additional peripherals or devices to connect to the system. \\
         Number of People Required &amp; I want to install and maintain the system by myself. \\
         Number of Tools Required (Tools Supported) &amp; I want to install it with basic tools, such as a power drill and Phillips screws. \\
         Maximum Wind Speed Supported &amp; The system should be stable and not be knocked over by the wind. \\
         Auto-Restart Mechanism (Emergency or Fail-Safe Mode) &amp; The system should be able to reboot automatically in case of a malfunction. \\
         Number of Vendors (Parts Availability) &amp; If a part fails, I want to be able to replace it with something readily available on the market. \\
         Number of Sensors Offered (Sensor Types) &amp; The system should measure wind, sunlight, rain, and soil moisture levels in the field. \\
         Budget &amp; I have a budget of \$1000 for this project. \\ 
         &amp; I do not want to pay any monthly subscription fees for using or operating the system. This should be a one-time investment. \\
         Parts Recycling &amp; I want to reuse some of the parts I already have on the farm, such as solar equipment or electrical wiring. \\
         \hline
    \end{tabular}
    \caption{Stakeholder Needs Capture}
    \label{tab:my_label}
\end{table}
\newpage
</pre></body></html>